...

S.P.C.(R)

Beam

S.P.C.(L)

BEAMmstrips

MWPC’s

TARGET

T.B.CAB

D.C.(1)

D.C.(2)

6 mmsA1Beam

1mm. MWPC’s

(ZYZY)

GAS ms(250 mm pitch)

1mm. MWPC’s

V. Lenti 12/5/1995

Pipe Line

S2 (

2x2x0.5 c m)

V3 ( fl

1.5 c m

)

V4 (

0.8 c m

)

Be a m

mS(

1:5)

Target

1mm.MWPC’s

S4 (

0.8x0.8 c

BEAM LAYOUT

BV

(doubl e pe a k vet o)

OLGA

g

CAL

A2A2(L)

A2(R) msHADRONCAL g

GAMS g mSTRIPS

Name

Planes

Pitch

Channels

BEAM4

20 mm.

5122 (ZY)

10.24 x 10.24

5 m. (A1)

10 m. (A2)

4 (ZYZY)

25 mm.

2048

5330 / 5355 / 5380 / 5405

10462 / 10487 / 10512 / 10537

51.2 x 51.2

20 m. (MSGC)

2 (YZ)

250 mm.

36819501 / 19553

100 x 100

BEAM2

2 (ZY)

512BEAM1

512Dimensions

X Position

-3998 / -3988

-3326 / -3315

BEAM3

512-2729 / -2718

BEAM5

-3942 / -3931

-2686 / -2676

W LAYOUT FOR WA102 (1995 RUN)